Copyright: Copyright © 1999 GST Technology Ltd
Citation: Copyright © 1999 GST Technology Ltd


Dialogfeld KeyPad-Einstellungen

Dieses Dialogfeld erscheint, wenn Sie Einstellungen aus dem Systemmenü wählen. Über dieses Dialogfeld können Sie verschiedene Aspekte von KeyPad steuern.

Listenfeld Standardschrift

Zeigt die in KeyPad verfügbaren Schriftarten an. Wählen Sie die Schriftart aus, deren Zeichensatz Sie im Zeichenfeld anzeigen möchten.

Die in KeyPad verfügbaren Schriftarten sind die Schriftarten, die auf dem ausgewählten Standarddrucker ausgegeben werden können.

Feld Anwendung

Enthält Optionen, mit denen das Zusammenspiel mit der Zielanwendung eingestellt werden kann.

Kontrollkästchen Direkt zurückkehren: Aktivieren Sie dieses Kontrollkästchen, um nach dem Einfügen des Zeichens direkt zur Zielanwendung zurückzukehren.

Feld Anzeige

Über die Optionen in diesem Feld können Sie die Anzeige des KeyPad-Fensters und den Inhalt des Zeichenfeldes festlegen.

Kontrollkästchen Immer im Vordergrund: Aktivieren Sie dieses Kontrollkästchen, damit das KeyPad-Fenster alle anderen Anwendungen auf Ihrem Bildschirm überlagert.

Kontrollkästchen Nur Symbolschriften: Aktivieren Sie dieses Kontrollkästchen, damit nur die verfügbaren Symbolschriften im Listenfeld Standardschrift angezeigt werden, wie z. B. Symbols und WingDings.

Kontrollkästchen Nur fremdsprachliche Sonderzeichen: Aktivieren Sie dieses Kontrollkästchen, um nur fremdsprachliche Zeichen in der ausgewählten Schriftart im Zeichenfeld anzuzeigen, z. B. à, æ, ð, è. Diese Option ist besonders nützlich, wenn Sie einen Text in einer Fremdsprache bearbeiten.


Dialogfeld Muster drucken

Dieses Dialogfeld erscheint, wenn Sie auf die Schaltfläche Drucken in der Symbolleiste klicken.

Sie können über dieses Feld entweder eine Schriftprobe oder den gesamten Zeichensatz der verfügbaren Schriftarten drucken.

Feld Ausgabe

Kompletter Zeichensatz: Wählen Sie diese Option, um alle Zeichen der ausgewählten Schriftarten zu drucken.

Schriftprobe: Wenn Sie diese Option wählen, wird das darunter liegende Eingabefeld aktiviert, in das Sie die Zeichen eingeben können, die Sie in der ausgewählten Schriftart drucken möchten.

Feld Drucker

Zeigt den aktuellen Drucker an.

Klicken Sie auf die Schaltfläche Einrichtung, um die Einstellungen des aktuellen Druckers zu ändern. Das Dialogfeld Drucker einrichten wird eingeblendet, in dem Sie die benötigten Einstellungen vornehmen können.

Feld Schriften

Listenfeld Nicht drucken: Zeigt alle Schriftarten an, die in KeyPad verfügbar sind. Wählen Sie hier die Schriftarten aus, die Sie zum Listenfeld Drucken hinzufügen möchten. Sie können mehrere aufeinander folgende Schriftarten auswählen, indem Sie zunächst auf die erste Schriftart klicken und dann die Umschalttaste gedrückt halten, während Sie auf die letzte der auszuwählenden Schriftarten klicken. Sollen mehrere Schriftarten ausgewählt werden, die nicht aufeinander folgen, halten Sie die Strg-Taste gedrückt, während Sie nacheinander auf die Schriftarten klicken.

Schaltfläche Hinzufügen ->: Klicken Sie auf diese Schaltfläche, um die im Listenfeld Nicht drucken markierten Schriftarten in das Listenfeld Drucken einzufügen.

Schaltfläche Alle hinzufügen ->: Klicken Sie auf diese Schaltfläche, um alle Schriften vom Listenfeld Nicht drucken in das Listenfeld Drucken zu übertragen.

Schaltfläche <- Entfernen: Klicken Sie auf diese Schaltfläche, um die im Listenfeld Drucken markierten Schriftarten in das Listenfeld Nicht drucken zu übertragen.

Schaltfläche <- Alle entfernen: Klicken Sie auf diese Schaltfläche, um alle Schriftarten aus Listenfeld Drucken in das Listenfeld Nicht drucken zu übertragen.

Listenfeld Drucken: Zeigt alle Schriftarten an, die gedruckt werden sollen. Sie können die hier aufgeführten Schriften wieder in das Listenfeld Nicht drucken verschieben, indem Sie sie auswählen und auf <- Entfernen klicken.
Sie können mehrere aufeinander folgende Schriftarten auswählen, indem Sie zunächst auf die erste Schriftart klicken und dann die Umschalttaste gedrückt halten, während Sie auf die letzte der auszuwählenden Schriftarten klicken. Sollen mehrere Schriftarten ausgewählt werden, die nicht aufeinander folgen, halten Sie die Strg-Taste gedrückt, während Sie nacheinander auf die Schriftarten klicken.


Dialogfeldfeld Drucker einrichten
Dialogfeld Drucker einrichten

Dieses Dialogfeld wird eingeblendet, wenn Sie auf die Schaltfläche Einrichtung im Dialogfeld Muster drucken klicken.

Über dieses Dialogfeld können Sie alle installierten Drucker auswählen und einstellen.

Feld Drucker

Zeigt Informationen zum Standarddrucker an.

Listenfeld Name: Klicken Sie auf den Pfeil rechts neben dem Listenfeld, um einen Drucker aus der Liste der verfügbaren Drucker auszuwählen.

Feld Format

Hochformat: Wählen Sie diese Option, um Ihr Dokument im Hochformat (vertikal) zu drucken.

Querformat: Wählen Sie diese Option, um Ihr Dokument im Querformat (horizontal) zu drucken.

Feld Papier

Listenfeld Format: Klicken Sie auf den Pfeil rechts neben dem Feld Format, um die Liste der verfügbaren Papierformate einzublenden. Wählen Sie das Papierformat aus, das sich in Ihrem Drucker befindet.

Listenfeld Zufuhr: Klicken Sie auf den Pfeil rechts neben dem Feld Zufuhr, um eine Liste mit Optionen für die Papierzufuhr einzublenden. Wählen Sie die Art der Papierzufuhr aus, die Sie für Ihren Drucker verwenden möchten.

Schaltfläche Eigenschaften: Klicken Sie auf diese Schaltfläche, um das Dialogfeld Eigenschaften für Ihren Drucker aufzurufen. Die darin angezeigten Einstellungen hängen vom ausgewählten Drucker ab.


Die horizontale Leiste enthält den Titel der Zielanwendung.

Sie können das KeyPad-Fenster auf dem Desktop verschieben, indem Sie die Titelleiste an eine andere Position ziehen.


 Wenn Sie auf das Systemmenü-Symbol in der linken oberen Ecke des Fensters klicken, wird das Windows-Systemmenü angezeigt. Dieses Menü enthält Befehle zum Verschieben, Schließen sowie Vergrößern und Verkleinern von Fenstern.

Über das KeyPad-Systemmenü können Sie außerdem das Dialogfeld KeyPad-Einstellungen anzeigen und das KeyPad-Programmfenster dauerhaft in den Vordergrund holen.

Einige Symbole und Dialogfelder verfügen ebenfalls über ein Systemmenü.


Die Leiste unterhalb der Titelleiste, welche die KeyPad-Schaltflächen enthält.


Die Größe, mit der der aktuelle Zeichensatz im Zeichenfeld angezeigt wird.

Das Ändern der Anzeigegröße in KeyPad wirkt sich nicht auf die Schriftgröße des Zeichens in der Zielanwendung aus.


Das Aussehen von Zeichen in KeyPad. Bekannte Schriftarten sind z. B. Times und Courier. Man unterscheidet zwischen Serifenschriftarten und serifenlosen Schriftarten. Die Schriftgröße und Schriftattribute wie z. B. fett oder kursiv sind von der Schriftart unabhängig.


Beliebige Buchstaben, Zahlen, Satzzeichen oder Symbole.


Alle Buchstaben, Zahlen, Satzzeichen und Symbole einer bestimmten Schriftart.


Die Windows-Anwendung, mit der KeyPad verbunden ist.


Markiert die Stelle, an der neu eingegebener Text eingefügt wird. Die Texteinfügemarke erscheint in der Regel in der Zielanwendung als blinkender vertikaler Strich und wird auch als Cursor bezeichnet.


Das Fenster oder Symbol, das Sie gerade verwenden. Es kann immer nur ein Fenster bzw. Symbol aktiv sein. Die Titelleiste des aktiven Fensters hebt sich farblich von denen der anderen Fenster ab (das aktive Symbol wird gleichermaßen durch eine andere Farbe gekennzeichnet).


Ein Fenster, in das Informationen eingegeben werden können. Die Interaktion mit KeyPad erfolgt über die jeweils in KeyPad eingeblendeten Dialogfelder.


Der aktive Drucker, wenn Sie keinen anderen Drucker ausgewählt haben. Es wird immer nur ein Drucker als Standarddrucker verwendet. Sie können den Standarddrucker über die Windows-Systemsteuerung einstellen. Ausführlichere Informationen entnehmen Sie bitte Ihrem Microsoft Windows-Handbuch.

Es empfiehlt sich, den am häufigsten verwendeten Drucker zum Standarddrucker zu machen.


KeyPad

KeyPad ist ein Hilfsprogramm, mit dem Sie Zeichen und Symbole, die nicht auf Ihrer Tastatur zur Verfügung stehen, in Dokumente, die mit einer Windows-Anwendung erstellt wurden, einfügen können. Verwenden Sie KeyPad, um folgende Zeichen einzufügen:

Mathematische Symbole: ¾, ÷, µ, ×, ±, X², 90°

Fremdsprachliche Sonderzeichen: é, â, Ä, Ç, ò, Æ

Andere Zeichen: ©, ®, ¢, €

Zeichen der Symbol-Zeichensätze

Das aktuelle Datum sowie die Uhrzeit

Hinweise:

KeyPad kann mit den meisten Windows-Textverarbeitungsprogrammen verwendet werden. Platzieren Sie die Texteinfügemarke an der Stelle im Text, an der Sie das Zeichen einfügen möchten, und klicken Sie dann einfach auf das entsprechende Zeichen in KeyPad. Es wird dadurch automatisch in die Zielanwendung kopiert.

Normalerweise wird ein Zeichen, sobald es in die Zielanwendung eingefügt wird, in der Schriftart formatiert, die dem Text in der Zielanwendung an der Texteinfügemarke zugewiesen wurde.

  Verwandte Themen


Laden von KeyPad

1.	Klicken Sie im Windows-Startmenü auf Programme, und wählen Sie den Ordner aus, in dem Sie KeyPad installiert haben.

2.	Klicken Sie auf das KeyPad-Symbol.

Sobald KeyPad gestartet wurde, wird der Name des mit KeyPad verknüpften Anwendungsprogramms in der Titelleiste angezeigt.

Hinweise:

Sie können KeyPad bei Ihrer Arbeit ununterbrochen eingeblendet lassen, indem Sie Immer im Vordergrund aus dem Systemmenü von KeyPad wählen.

Einige greenstreet-Anwendungen bieten eine Menüoption oder eine Schnellschaltfläche, die es Ihnen ermöglicht, KeyPad innerhalb der Anwendung zu laden. Informationen zur Unterstützung von KeyPad finden Sie in der Dokumentation zur greenstreet-Anwendung.

  Verwandte Themen


Einfügen von Zeichen

1.	Setzen Sie die Texteinfügemarke in der Zielanwendung an die Stelle, an der das Zeichen eingefügt werden soll. Eventuell müssen Sie dazu zuvor in den Textmodus wechseln oder das Textwerkzeug auswählen.

2.	Starten Sie KeyPad, sofern Sie es noch nicht geladen haben.

3.	Klicken Sie im Zeichenfeld auf das Zeichen, das Sie einfügen wollen. Das Zeichen wird an der Texteinfügemarke in die Zielanwendung eingefügt.

  Verwandte Themen


Einfügen von Uhrzeit und Datum

1.	Setzen Sie in der Zielanwendung die Texteinfügemarke an die Stelle, an der Sie das Datum und/oder die Uhrzeit einfügen möchten. Eventuell müssen Sie dazu in den Textmodus wechseln oder das Textwerkzeug auswählen.

2.	Laden Sie KeyPad, sofern Sie es noch nicht geladen haben.

3.	Klicken Sie auf die Schaltfläche Uhrzeit bzw. Datum in der Symbolleiste. Die aktuelle Uhrzeit bzw. das Datum wird daraufhin an der Texteinfügemarke in die Zielanwendung eingefügt.

Hinweis:

Das Format für Datum und Uhrzeit basiert auf den Ländereinstellungen in Windows. Einzelheiten finden Sie in Ihrem Microsoft Windows-Handbuch.

  Verwandte Themen


Auswählen einer Schriftart

Im Listenfeld Schriftarten wird eine Liste aller verfügbaren Schriftarten angezeigt.

Wählen Sie eine Schriftart aus der Liste aus. Der dazugehörige Zeichensatz erscheint im Zeichenfeld.

Hinweis:

Sie können auch die Schriftart wechseln, indem Sie auf den Namen der gewünschten Schriftart im Dialogfeld KeyPad-Voreinstellungen doppelklicken.

  Verwandte Themen


Vorschau einer Schriftart

Wählen Sie im Listenfeld die Schriftart aus, die Sie ansehen möchten.

  Verwandte Themen


Ändern der Anzeigegröße

Klicken Sie auf die Schaltfläche Vergrößern in der Symbolleiste, um die Zeichen im Zeichenfeld zu vergrößern.

Klicken Sie auf die Schaltfläche Verkleinern in der Symbolleiste, um die Zeichen im Zeichenfeld zu verkleinern.

Das Anzeigeformat in KeyPad wirkt sich nicht auf die Schriftgröße des Zeichens in der Zielanwendung aus.

Hinweis:

Um das KeyPad-Fenster auf seine minimale Größe zu verkleinern, klicken Sie mit der rechten Maustaste in das Zeichenfeld. Die Titel- und Symbolleiste werden ausgeblendet. Erneutes Klicken mit der rechten Maustaste stellt die ursprüngliche Fenstergröße wieder her.

  Verwandte Themen


Ändern der Voreinstellungen

1.	Klicken Sie auf die Schaltfläche Einstellungen. Das Dialogfeld KeyPad-Einstellungen wird angezeigt.

2.	Wählen Sie im Listenfeld Standardschrift die Schriftart aus, deren Zeichensatz im Zeichenfeld angezeigt werden soll.

3.	Geben Sie anschließend im Feld Anwendung ein, ob Sie direkt in die Zielanwendung zurückkehren möchten, nachdem Sie das gewünschte Zeichen eingefügt haben, und ob diese Zeichen in der in KeyPad ausgewählten Schrift formatiert werden sollen.

4.	Bestimmen Sie im Feld Anzeige, ob KeyPad alle anderen Anwendungen überlagern soll, und wählen Sie aus, welche Schriftarten und Zeichen verfügbar sein sollen.

5.	Klicken Sie auf OK, wenn Sie alle gewünschten Einstellungen vorgenommen haben.

  Verwandte Themen


Drucken von Mustern

1.	Klicken Sie auf die Schaltfläche Drucken, um das Dialogfeld Muster drucken anzuzeigen.

2.	Bestimmen Sie im Feld Ausgabe, ob Sie den gesamten Zeichensatz oder nur Schriftproben der ausgewählten Schriftarten drucken möchten.

3.	Möchten Sie lediglich Schriftproben drucken, geben Sie die gewünschten Zeichen in das darunter liegenden Feld ein.

4.	Möchten Sie die Einstellungen für den aktuellen Drucker ändern oder einen anderen Drucker auswählen, klicken Sie auf die Schaltfläche Einrichtung. Das Dialogfeld Drucker einrichten wird angezeigt.

5.	Wählen Sie im Feld Schriften die Schriftarten aus, die Sie drucken möchten.

Die in KeyPad verfügbaren Schriftarten stimmen mit denen Ihres Standarddruckers überein.

6.	Klicken Sie auf OK, um die Schriften entsprechend den ausgewählten Optionen zu drucken.

  Verwandte Themen


Beenden von KeyPad

Sie können KeyPad mit einem der folgenden Schritte beenden:

Klicken Sie in der Symbolleiste auf die Schaltfläche Beenden.

Klicken Sie auf die Schließschaltfläche in der rechten oberen Ecke des Programmfensters.

Doppelklicken Sie auf das Symbol für das Systemmenü.

Wählen Sie Schließen aus dem Systemmenü.

  Verwandte Themen


Das KeyPad-Fenster

Klicken Sie auf einen Bereich des KeyPad-Fensters, um eine kurze Beschreibung dazu anzuzeigen.

  Verwandte Themen


Hinweise, Tipps und Informationen

Einige greenstreet-Programme enthalten eine Schnellschaltfläche oder einen Menübefehl, mit dem Sie KeyPad im Programm selbst starten können. Weitere Einzelheiten finden Sie in der mit dem greenstreet-Programm gelieferten Dokumentation.

Sobald Sie KeyPad geladen haben, erscheint der Name der Zielanwendung in der Titelleiste.

Je nach Zielanwendung müssen Sie eventuell das Textwerkzeug auswählen, bevor Sie KeyPad verwenden können. In greenstreet Draw müssen Sie beispielsweise zuerst das Textwerkzeug auswählen und die Texteinfügemarke platzieren, bevor Sie mit KeyPad Zeichen einfügen können.

Sie können KeyPad während des Arbeitens in der Zielanwendung ständig im Vordergrund anzeigen. Wählen Sie dazu im Systemmenü die Option Immer im Vordergrund.

Beim Einfügen eines Zeichens übernimmt dieses normalerweise die in der Zielanwendung an der Texteinfügemarke aktivierte Schriftart.


Symbolleiste: Die KeyPad-Schaltflächen unterhalb der Titelleiste


Schaltfläche Beenden: Schließt KeyPad und kehrt zur Zielanwendung zurück.

Schnelltaste: Alt + F4


Schaltfläche Voreinstellungen: Blendet das Dialogfeld KeyPad-Voreinstellungen ein, in dem Sie KeyPad konfigurieren können. Ihre Voreinstellungen werden gespeichert und stehen beim nächsten Laden von KeyPad wieder zur Verfügung.


Feld Zeichencode: Dieses Feld zeigt den ANSI-Code des gerade im Zeichenfeld ausgewählten Zeichens an. Sie können dieses Zeichen ohne Verwendung von KeyPad in Ihr Dokument einfügen, indem Sie die Alt-Taste gedrückt halten und die angezeigte Nummer eingeben.


Listenfeld Schriftart: Dieses Listenfeld enthält alle im Programm verfügbaren Schriftarten. Klicken Sie auf die gewünschte Schriftart, um sie auszuwählen.

Wenn Sie KeyPad zusammen mit einer greenstreet-Anwendung verwenden, können Sie Zeichen in der in KeyPad ausgewählten Schrift in die Zielanwendung einfügen, wenn das entsprechende Kontrollkästchen im Dialogfeld KeyPad-Einstellungen aktiviert ist. Wenn Sie KeyPad mit einer Anwendung eines anderen Herstellers verwenden, werden die eingefügten Zeichen in der Schriftart formatiert, die in der Zielanwendung an der Einfügemarke aktiviert ist.


Schaltfläche Vergrößern: Vergrößert die Zeichen im Zeichenfeld. Dieser Befehl ist besonders hilfreich, wenn Sie an einem Bildschirm mit hoher Auflösung arbeiten.

Das Anzeigeformat in KeyPad ist unabhängig von der Schriftgröße des Zeichens in der Zielanwendung.


Schaltfläche Verkleinern: Verkleinert die Zeichen im Zeichenfeld.

Das Anzeigeformat in KeyPad ist unabhängig von der Schriftgröße des Zeichens in der Zielanwendung.


Schaltfläche Uhrzeit: Fügt die aktuelle Uhrzeit an der Einfügemarke in das Dokument in der Zielanwendung ein.

Die Zeitangabe richtet sich nach den Ländereinstellungen in Windows. Sie können entweder eine 12-Stunden- oder eine 24-Stundenuhr sowie eine Anzahl damit verbundener Optionen verwenden. So können Sie beispielsweise Endungen, wie AM für morgens und PST für Pacific Standard Time, an die Uhrzeit anhängen. Einzelheiten finden Sie in Ihrem Microsoft Windows-Handbuch.


Schaltfläche Datum: Fügt das aktuelle Datum an der Einfügemarke in das Dokument in der Zielanwendung ein.

Die Angabe des Datums richtet sich nach den Ländereinstellungen in Windows. So können Sie beispielsweise die Reihenfolge von Tag, Monat und Jahr sowie das Satzzeichen zum Trennen der Datumsbestandteile ändern. Einzelheiten finden Sie in Ihrem Microsoft Windows-Handbuch.


Schaltfläche Drucken: Zeigt das Dialogfeld Muster drucken an, über das Sie eine Schriftprobe oder den gesamten Zeichensatz der verfügbaren Schriften ausdrucken können.

Die in KeyPad verfügbaren Schriftarten entsprechen denen des Standarddruckers.


Schaltfläche Info: Zeigt Informationen zu KeyPad wie z. B. die Versionsnummer an.


Zeichenfeld: Zeigt den Zeichensatz der ausgewählten Schrift an. Klicken Sie auf ein Zeichen, um es an der Einfügemarke in das Dokument in der Zielanwendung einzufügen.

Wenn Sie den Mauszeiger über ein Zeichen bewegen, wird der ANSI-Code des Zeichens im Feld Zeichencode angezeigt.


Titelleiste: Zeigt den Namen der ausgewählten Zielanwendung an.

Sie können das KeyPad-Fenster auf dem Bildschirm verschieben, indem Sie die Titelleiste an eine andere Position ziehen.


Schaltfläche Minimieren: Verkleinert das KeyPad-Fenster auf Symbolgröße.

Wenn Sie das KeyPad-Fenster auf Symbolgröße verkleinern, bleibt es weiterhin aktiv, nimmt aber keinen Platz mehr auf Ihrem Bildschirm ein.


Schaltfläche Maximieren: Diese Schaltfläche ist in KeyPad nicht verfügbar. Sie können daher das KeyPad-Fenster nicht so vergrößern, dass es den gesamten Bildschirm einnimmt.


Systemmenüfeld: Klicken Sie darauf, um das Systemmenü anzuzeigen. Dieses enthält Befehle zum Verschieben, Schließen, Vergrößern und Verkleinern von Fenstern. Über dieses Menü können Sie außerdem zu anderen Anwendungen wechseln.

Wenn Sie eine Maus verwenden, können Sie diese Befehle durch Klicken und Ziehen ausführen.

Das KeyPad-Systemmenü enthält zusätzliche Befehle, mit denen Sie das KeyPad-Fenster dauerhaft in den Vordergrund holen und das Dialogfeld KeyPad-Voreinstellungen sowie Informationen zu KeyPad anzeigen können.


Schaltfläche Hilfe:

Ruft die KeyPad-Hilfe auf.

Schnelltaste: F1


Schaltfläche Schließen: Schließt die KeyPad-Fenster und kehrt zur Zielanwendung zurück.